en	access.denied
fo	Access was denied

en	stacktrace
fo	The problem occured here

en	http_error.title
fo	Error

en	http_error.description
fo	Something is wrong

en	http_error.suggestion
fo	A critical error occurred, please try again. You may have found a software problem, please contact your administrator if the problem persists.

en	http_error_404.description
fo	Page not found

en	http_error_404.suggestion
fo	We could not find the page you were looking for. Please return to your dashboard and start over.

en	http_error_403.description
fo	Page is restricted

en	http_error_403.suggestion
fo	Sorry, but you don't have sufficient permissions to see this page. Please talk to your administrator if you think this is an error.